She&#39;s getting so big! I wouldn&#39;t know wha...

She's getting so big! I wouldn't know what it is like to have a baby in the correct height AND weight percentile. All my boys have been way more round than tall:) Those shots are always so hard to watch. However, at least now she doesn't see it coming. Wait till she's 4 and gets 4 shots. That well- check is the worst.